Remsen 1 Seating Layout File rem1, Revision A, jmb 11/99 Johns Hopkins University

There are 350 seats, including 30 left-handed seats. With alternate seating, there is space for 188 people, but only if 26 of them are left-handed. Every third seat is labeled (except that some labels are missing). There is no row I or O.

⋆ Left-handed seats are located at the left end of every half row. † Watch for currently broken tables at seats N20, Q2 and Q4.

EVEN NUMBERS ARE ON THIS SIDE (WEST) ODD NUMBERS ARE ON THIS SIDE (EAST)

10 8 6 4† 2†⋆ Q  Q 1 3 5 7 9⋆
22 20 18 16 14 12 10 8 6 4 2⋆ P  P 1 3 5 7 9 11 13 15 17 19 21⋆
22 20† 18 16 14 12 10 8 6 4 2⋆ N  N 1 3 5 7 9 11 13 15 17 19 21⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ M 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ L 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ K 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ J 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ H 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ G 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ F 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
28 26 24 22 20 18 16 14 12 10 8 6 4 2⋆ E 1 3 5 7 9 11 13 15 17 19 21 23 25 27⋆
26 24 22 20 18 16 14 12 10 8 6 4 2⋆ D 1 3 5 7 9 11 13 15 17 19 21 23 25⋆
22 20 18 16 14 12 10 8 6 4 2⋆ C 1 3 5 7 9 11 13 15 17 19 21⋆
20 18 16 14 12 10 8 6 4 2⋆ B 1 3 5 7 9 11 13 15 17 19⋆
18 16 14 12 10 8 6 4 2⋆ A 1 3 5 7 9 11 13 15 17⋆

BENCH