Mergenthaler Auditorium (Room 111) Seating Layout File merg111, Revision A, jmb 11/99

Johns Hopkins University

There are 132 fixed seats, all of them right-handed. The tables at the back currently have 4 extra movable chairs. With alternate seating, there is space for 70 people, in the fixed seats. Seats are not labeled. There is no row I. † The table at seat G203 is broken (as of Nov. ’99).

207 206 205 204 203 202 201 J

208 207 206 205 204 203 202 201 H  TABLES  DOOR →

208 207 206 205 204 203† 202 201 G  107 106 105 104 103 102 101 G

210 209 208 207 206 205 204 203 202 201 F 108 107 106 105 104 103 102 101 F

210 209 208 207 206 205 204 203 202 201 E 108 107 106 105 104 103 102 101 E

209 208 207 206 205 204 203 202 201 D 107 106 105 104 103 102 101 D 2  1

209 208 207 206 205 204 203 202 201 C 107 106 105 104 103 102 101 C 2  1

208 207 206 205 204 203 202 201 B 106 105 104 103 102 101 B 2  1

207 206 205 204 203 202 201 A 105 104 103 102 101 A 2  1

← DOOR STAGE